Title: ENGLISH - LESSON 05 - LEARNING ACTIVITY 1

FALSE DATA

FALSE DATA

Instruções

English

Sem título Texto

After watching part of the episode in the Bad News section, read the sentences and check the false one.

Português

Sem título Texto

Após assistir parte do episódio na seção Bad News, leia as frases e marque a opção falsa.

QUIZ FALSE DATA

Question 1

Q: .
- Roy and Dave are not relatives.
- Harold and Dave are not relatives. (correct)
- Rachael and Dave are not relatives.

Question 2

Q: .
- Harold had been through an accident. (correct)
- Harold's mother had a heart attack.
- Harold called Dave.

Question 3

Q: .
- Dave received a Iot of postcards from his mother.
- Rachael didn't keep any of Dave's mother's postcards. (correct)
- Dave thought it was worth trying to use the sender's address to find his mother's house.

Question 4

Q: .
- Harold sounds very angry on the phone.
- Harold wants Dave to visit their mother.
- Dave's mother had the heart attack much before the plane crash. (correct)